<template>
  <error-shell
    :code="500"
    color="error"
    description="伺服器發生非預期錯誤，請稍後再試。"
    :icon="mdiServer"
    title="系統發生錯誤"
  />
</template>

<script setup lang="ts">
import { mdiServer } from '@mdi/js'
import ErrorShell from './ErrorShell.vue'
</script>
