<template>
  <error-shell
    code="MAINTENANCE"
    color="info"
    description="目前系統正在維護，請稍後再試。"
    :icon="mdiTools"
    :show-login="false"
    title="系統維護中"
  />
</template>

<script setup lang="ts">
import { mdiTools } from '@mdi/js'
import ErrorShell from './ErrorShell.vue'
</script>
