<template>
  <error-shell
    :code="404"
    color="info"
    description="你輸入的網址不存在，或頁面已被移除。"
    :icon="mdiMapMarkerQuestionOutline"
    :show-login="false"
    title="找不到頁面"
  />
</template>

<script setup lang="ts">
import { mdiMapMarkerQuestionOutline } from '@mdi/js'
import ErrorShell from './ErrorShell.vue'
</script>
