<template>
  <ErrorShell
    code="NETWORK"
    color="warning"
    description="無法連線到伺服器，請檢查網路或稍後再試。"
    icon="mdi-wifi-off"
    title="網路連線異常"
  />
</template>

<script setup lang="ts">
import ErrorShell from './ErrorShell.vue'
</script>

